X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/9dcc70fc137fac02991f3ebe830748badb4eab35..f14b66751cfaf92a2bc28331d8878789d4040e8f:/src/components/side-panel/side-panel.tsx

diff --git a/src/components/side-panel/side-panel.tsx b/src/components/side-panel/side-panel.tsx
index 23ee904f..f78d2a02 100644
--- a/src/components/side-panel/side-panel.tsx
+++ b/src/components/side-panel/side-panel.tsx
@@ -94,7 +94,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: Theme) => ({
         overflowY: 'auto',
         minWidth: '240px',
         whiteSpace: 'nowrap',
-        marginTop: '38px',
+        marginTop: '52px',
         display: 'flex',
         flexGrow: 1,
     },
