X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/9d13b7b84e145646fe3d5e61e26a2ceead76d039..17c26d8f0950c485cf160ed28c4bd1872bff868e:/src/views/run-process-panel/run-process-second-step.tsx

diff --git a/src/views/run-process-panel/run-process-second-step.tsx b/src/views/run-process-panel/run-process-second-step.tsx
index 8e855ab3..a2ed9a21 100644
--- a/src/views/run-process-panel/run-process-second-step.tsx
+++ b/src/views/run-process-panel/run-process-second-step.tsx
@@ -12,7 +12,7 @@ import { RootState } from '~/store/store';
 import { isValid } from 'redux-form';
 import { RUN_PROCESS_INPUTS_FORM } from './run-process-inputs-form';
 import { RunProcessAdvancedForm, RUN_PROCESS_ADVANCED_FORM } from './run-process-advanced-form';
-import { createSelector, createStructuredSelector } from 'reselect';
+import { createStructuredSelector } from 'reselect';
 import { WorkflowPresetSelect } from '~/views/run-process-panel/workflow-preset-select';
 import { selectPreset } from '~/store/run-process-panel/run-process-panel-actions';
 
