X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/9c2c8aa06d5693a6e2b00e1d8ec0a8ca79098ce0..770ffecbecc120d200bebaaf4606dfc055c64008:/src/views/project-panel/project-panel.tsx

diff --git a/src/views/project-panel/project-panel.tsx b/src/views/project-panel/project-panel.tsx
index 67264511..97f79517 100644
--- a/src/views/project-panel/project-panel.tsx
+++ b/src/views/project-panel/project-panel.tsx
@@ -51,9 +51,7 @@ type CssRules = 'root' | "button";
 
 const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     root: {
-        position: 'relative',
         width: '100%',
-        height: '100%'
     },
     button: {
         marginLeft: theme.spacing.unit
