X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/9c15617f293ab41ea8b8e2962ecd1d109b80a026..4ae10b1717541336c32778bc69bd1d4ea8fc78ab:/src/views/run-process-panel/inputs/float-input.tsx?ds=sidebyside

diff --git a/src/views/run-process-panel/inputs/float-input.tsx b/src/views/run-process-panel/inputs/float-input.tsx
index 62093ac0..aeaf6cdd 100644
--- a/src/views/run-process-panel/inputs/float-input.tsx
+++ b/src/views/run-process-panel/inputs/float-input.tsx
@@ -51,4 +51,4 @@ class FloatInputComponent extends React.Component<GenericInputProps> {
 }
 
 const Input = (props: GenericInputProps) =>
-    <MaterialInput {...props.input} />;
+    <MaterialInput fullWidth {...props.input} error={props.meta.touched && !!props.meta.error} />;
