X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/9be874f7744b5ceb53f4be20d1748db34859468a..676a8457983ed1660493f747cc4bb506c8ddbe9c:/src/views-components/form-fields/search-bar-form-fields.tsx

diff --git a/src/views-components/form-fields/search-bar-form-fields.tsx b/src/views-components/form-fields/search-bar-form-fields.tsx
index 837f13cb..2eea38c4 100644
--- a/src/views-components/form-fields/search-bar-form-fields.tsx
+++ b/src/views-components/form-fields/search-bar-form-fields.tsx
@@ -71,6 +71,12 @@ export const SearchBarTrashField = () =>
         component={CheckboxField}
         label="In trash" />;
 
+export const SearchBarPastVersionsField = () =>
+    <Field
+        name='pastVersions'
+        component={CheckboxField}
+        label="Past versions" />;
+
 export const SearchBarDateFromField = () =>
     <Field
         name='dateFrom'
