X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/9a6108f929e78dd1b68dcf3cc27fd934d1fde9d6..b7de31f185fccd2f9b276c1e89754d288e7facfe:/src/index.tsx

diff --git a/src/index.tsx b/src/index.tsx
index 62db7f0f..801a56a1 100644
--- a/src/index.tsx
+++ b/src/index.tsx
@@ -306,3 +306,4 @@ const createSampleProcess = ({ containerRequestService }: ServiceRepository) =>
     });
 };
 
+// force build comment #1
