X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/99a99d1b9da187562407aebe144ac8140603d684..3c7e3cdc547ad5468421e1c049daa94b0d4b8bc0:/src/views/main-panel/main-panel-root.tsx

diff --git a/src/views/main-panel/main-panel-root.tsx b/src/views/main-panel/main-panel-root.tsx
index e7daaf00..5853acb0 100644
--- a/src/views/main-panel/main-panel-root.tsx
+++ b/src/views/main-panel/main-panel-root.tsx
@@ -2,15 +2,15 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { StyleRulesCallback, WithStyles, withStyles, Grid, LinearProgress } from '@material-ui/core';
-import { User } from "~/models/user";
-import { ArvadosTheme } from '~/common/custom-theme';
-import { WorkbenchPanel } from '~/views/workbench/workbench';
-import { LoginPanel } from '~/views/login-panel/login-panel';
-import { InactivePanel } from '~/views/inactive-panel/inactive-panel';
-import { WorkbenchLoadingScreen } from '~/views/workbench/workbench-loading-screen';
-import { MainAppBar } from '~/views-components/main-app-bar/main-app-bar';
+import { User } from "models/user";
+import { ArvadosTheme } from 'common/custom-theme';
+import { WorkbenchPanel } from 'views/workbench/workbench';
+import { LoginPanel } from 'views/login-panel/login-panel';
+import { InactivePanel } from 'views/inactive-panel/inactive-panel';
+import { WorkbenchLoadingScreen } from 'views/workbench/workbench-loading-screen';
+import { MainAppBar } from 'views-components/main-app-bar/main-app-bar';
 
 type CssRules = 'root';
 
@@ -31,13 +31,14 @@ export interface MainPanelRootDataProps {
     isNotLinking: boolean;
     isLinkingPath: boolean;
     siteBanner: string;
+    sessionIdleTimeout: number;
 }
 
 type MainPanelRootProps = MainPanelRootDataProps & WithStyles<CssRules>;
 
 export const MainPanelRoot = withStyles(styles)(
     ({ classes, loading, working, user, buildInfo, uuidPrefix,
-        isNotLinking, isLinkingPath, siteBanner }: MainPanelRootProps) =>
+        isNotLinking, isLinkingPath, siteBanner, sessionIdleTimeout }: MainPanelRootProps) =>
         loading
             ? <WorkbenchLoadingScreen />
             : <>
@@ -46,10 +47,16 @@ export const MainPanelRoot = withStyles(styles)(
                     buildInfo={buildInfo}
                     uuidPrefix={uuidPrefix}
                     siteBanner={siteBanner}>
-                    {working ? <LinearProgress color="secondary" /> : null}
+                    {working
+                        ? <LinearProgress color="secondary" data-cy="linear-progress" />
+                        : null}
                 </MainAppBar>}
                 <Grid container direction="column" className={classes.root}>
-                    {user ? (user.isActive || (!user.isActive && isLinkingPath) ? <WorkbenchPanel isNotLinking={isNotLinking} isUserActive={user.isActive} /> : <InactivePanel />) : <LoginPanel />}
+                    {user
+                        ? (user.isActive || (!user.isActive && isLinkingPath)
+                            ? <WorkbenchPanel isNotLinking={isNotLinking} isUserActive={user.isActive} sessionIdleTimeout={sessionIdleTimeout} />
+                            : <InactivePanel />)
+                        : <LoginPanel />}
                 </Grid>
             </>
 );
