X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/993c6c511af30163a2826d6992720b6be397943b..8d491bda9abdc1a8d5f0ac8bcea3bf77eb221888:/src/views/subprocess-panel/subprocess-panel-root.tsx?ds=sidebyside

diff --git a/src/views/subprocess-panel/subprocess-panel-root.tsx b/src/views/subprocess-panel/subprocess-panel-root.tsx
index d4ccae9c..52fbc51f 100644
--- a/src/views/subprocess-panel/subprocess-panel-root.tsx
+++ b/src/views/subprocess-panel/subprocess-panel-root.tsx
@@ -91,6 +91,7 @@ export const SubprocessPanelRoot = (props: SubprocessPanelProps & MPVPanelProps)
         defaultViewMessages={DEFAULT_VIEW_MESSAGES}
         doHidePanel={props.doHidePanel}
         doMaximizePanel={props.doMaximizePanel}
+        doUnMaximizePanel={props.doUnMaximizePanel}
         panelMaximized={props.panelMaximized}
         panelName={props.panelName} />;
 };
