X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/975f9b6c2e0f6d5988c01d7dbe6e2a6214d54de6..68ac0f45eef3ed971615fb0a0849c950b74d7e06:/src/components/data-table/data-table.test.tsx

diff --git a/src/components/data-table/data-table.test.tsx b/src/components/data-table/data-table.test.tsx
index ec84acac..7e460c89 100644
--- a/src/components/data-table/data-table.test.tsx
+++ b/src/components/data-table/data-table.test.tsx
@@ -6,8 +6,8 @@ import * as React from "react";
 import { mount, configure } from "enzyme";
 import { TableHead, TableCell, Typography, TableBody, Button, TableSortLabel } from "@material-ui/core";
 import * as Adapter from "enzyme-adapter-react-16";
-import DataTable, { DataColumns } from "./data-table";
-import DataTableFilters from "../data-table-filters/data-table-filters";
+import { DataTable, DataColumns } from "./data-table";
+import { DataTableFilters } from "../data-table-filters/data-table-filters";
 import { SortDirection } from "./data-column";
 
 configure({ adapter: new Adapter() });
@@ -169,6 +169,4 @@ describe("<DataTable />", () => {
         dataTable.find(DataTableFilters).prop("onChange")([]);
         expect(onFiltersChange).toHaveBeenCalledWith([], columns[0]);
     });
-
-
-});
\ No newline at end of file
+});
