X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/9638d07155597ad006b2c7e325e82a1bc5281aba..98adeb294aa8bf1c1691f70ab095d20a96c0d375:/src/views/process-panel/process-panel-root.tsx

diff --git a/src/views/process-panel/process-panel-root.tsx b/src/views/process-panel/process-panel-root.tsx
index eb8440f3..63b6aa4d 100644
--- a/src/views/process-panel/process-panel-root.tsx
+++ b/src/views/process-panel/process-panel-root.tsx
@@ -25,6 +25,7 @@ export interface ProcessPanelRootActionProps {
     openProcessInputDialog: (uuid: string) => void;
     navigateToOutput: (uuid: string) => void;
     navigateToWorkflow: (uuid: string) => void;
+    cancelProcess: (uuid: string) => void;
 }
 
 export type ProcessPanelRootProps = ProcessPanelRootDataProps & ProcessPanelRootActionProps;
@@ -39,6 +40,7 @@ export const ProcessPanelRoot = ({ process, ...props }: ProcessPanelRootProps) =
                     openProcessInputDialog={props.openProcessInputDialog}
                     navigateToOutput={props.navigateToOutput}
                     openWorkflow={props.navigateToWorkflow}
+                    cancelProcess={props.cancelProcess}
             />
             </Grid>
             <Grid item sm={12} md={5}>
