X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/95cad596903ea8ade5dd6a9fd1895e4fdffcc2bc..56e6dc7af513fd7bdb043e9c74a1d2848da41c38:/src/views/collection-panel/collection-panel.tsx

diff --git a/src/views/collection-panel/collection-panel.tsx b/src/views/collection-panel/collection-panel.tsx
index a28d5254..b40e5af6 100644
--- a/src/views/collection-panel/collection-panel.tsx
+++ b/src/views/collection-panel/collection-panel.tsx
@@ -73,14 +73,14 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     },
     iconHeader: {
         fontSize: '1.875rem',
-        color: theme.customs.colors.yellow700
+        color: theme.customs.colors.grey600
     },
     tag: {
         marginRight: theme.spacing.unit / 2,
         marginBottom: theme.spacing.unit / 2
     },
     label: {
-        fontSize: '0.875rem'
+        fontSize: '0.975rem',
     },
     centeredLabel: {
         fontSize: '0.875rem',
