X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/8e913832ad289fd28700f4081046b7de48688130..9eca8f9b0755eaeb1104a8e699a463f0ac127040:/src/views/process-panel/process-panel-root.tsx

diff --git a/src/views/process-panel/process-panel-root.tsx b/src/views/process-panel/process-panel-root.tsx
index 7a240899..c972c0a6 100644
--- a/src/views/process-panel/process-panel-root.tsx
+++ b/src/views/process-panel/process-panel-root.tsx
@@ -205,7 +205,7 @@ export const ProcessPanelRoot = withStyles(styles)(
                     xs
                     maxHeight="50%"
                     data-cy="process-children">
-                    <SubprocessPanel />
+                    <SubprocessPanel process={process} />
                 </MPVPanelContent>
             </MPVContainer>
         ) : (
