X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/8dd64fbb819524cb3f86f5313b44fe228a20165d..0ca7039728489e25ae1e196278454e7bafbca948:/src/views/site-manager-panel/site-manager-panel-root.tsx

diff --git a/src/views/site-manager-panel/site-manager-panel-root.tsx b/src/views/site-manager-panel/site-manager-panel-root.tsx
index 223e373c..e6cc5b23 100644
--- a/src/views/site-manager-panel/site-manager-panel-root.tsx
+++ b/src/views/site-manager-panel/site-manager-panel-root.tsx
@@ -158,7 +158,10 @@ export const SiteManagerPanelRoot = compose(
                                             disabled={validating || session.status === SessionStatus.INVALIDATED || session.active}
                                             className={session.loggedIn ? classes.buttonLoggedIn : classes.buttonLoggedOut}
                                             onClick={() => toggleSession(session)}>
-                                            {validating ? "Validating" : (session.loggedIn ? "Logged in" : "Logged out")}
+                                            {validating ? "Validating"
+                                                : (session.loggedIn ?
+                                                    (session.userIsActive ? "Logged in" : "Inactive")
+                                                    : "Logged out")}
                                         </Button>
                                     </TableCell>
                                     <TableCell>
