X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/8dc7e5fc6f2d2a7ce853f935a0a84dacb8c0585f..0efebb152c5b21d3d1d58a2a27058c1e661342b9:/src/views/process-log-panel/process-log-form.tsx?ds=sidebyside

diff --git a/src/views/process-log-panel/process-log-form.tsx b/src/views/process-log-panel/process-log-form.tsx
index dfac832f..eab9fe1d 100644
--- a/src/views/process-log-panel/process-log-form.tsx
+++ b/src/views/process-log-panel/process-log-form.tsx
@@ -31,11 +31,11 @@ export const ProcessLogForm = withStyles(styles)(
         <form autoComplete="off">
             <FormControl className={classes.formControl}>
                 <InputLabel shrink htmlFor="log-label-placeholder">
-                    Log
+                    Event Type
                 </InputLabel>
                 <Select
                     value={selectedFilter.value}
-                    onChange={event => onChange}
+                    onChange={({ target }) => onChange({ label: target.innerText, value: target.value })}
                     input={<Input name="eventType" id="log-label-placeholder" />}
                     name="eventType">
                     {
