X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/8a057a6a69f4182cd3adc67c7d1071832ffeaa0b..67d63d61aa5a1f1bc1bb85bf6b788e6c0d21e298:/src/components/move-to-dialog/move-to-dialog.tsx?ds=sidebyside

diff --git a/src/components/move-to-dialog/move-to-dialog.tsx b/src/components/move-to-dialog/move-to-dialog.tsx
index 51f5fbf6..2bfc2c3d 100644
--- a/src/components/move-to-dialog/move-to-dialog.tsx
+++ b/src/components/move-to-dialog/move-to-dialog.tsx
@@ -10,7 +10,7 @@ import { WithDialogProps } from "~/store/dialog/with-dialog";
 import { ProjectTreePicker } from "~/views-components/project-tree-picker/project-tree-picker";
 import { MOVE_TO_VALIDATION } from "~/validators/validators";
 
-export const MoveTo = (props: WithDialogProps<string> & InjectedFormProps<{ name: string }>) =>
+export const MoveToDialog = (props: WithDialogProps<string> & InjectedFormProps<{ name: string }>) =>
     <form>
         <Dialog open={props.open}
             disableBackdropClick={true}
