X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/89c3c647797787377f4d950b38d320ee3b28e92c..9d13b7b84e145646fe3d5e61e26a2ceead76d039:/src/views/run-process-panel/inputs/file-array-input.tsx?ds=sidebyside

diff --git a/src/views/run-process-panel/inputs/file-array-input.tsx b/src/views/run-process-panel/inputs/file-array-input.tsx
index bb85825d..c134548c 100644
--- a/src/views/run-process-panel/inputs/file-array-input.tsx
+++ b/src/views/run-process-panel/inputs/file-array-input.tsx
@@ -263,7 +263,7 @@ const FileArrayInputComponent = connect(mapStateToProps)(
                     </div>
                     <Divider />
                     <div className={classes.chips}>
-                        <Typography variant='subheading'>Selected files ({this.state.files.length}):</Typography>
+                        <Typography variant='subtitle1'>Selected files ({this.state.files.length}):</Typography>
                         <Chips
                             orderable
                             deletable
