X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/89c3c647797787377f4d950b38d320ee3b28e92c..17c26d8f0950c485cf160ed28c4bd1872bff868e:/src/views/run-process-panel/run-process-panel.tsx

diff --git a/src/views/run-process-panel/run-process-panel.tsx b/src/views/run-process-panel/run-process-panel.tsx
index c8411ad7..c5b95c3b 100644
--- a/src/views/run-process-panel/run-process-panel.tsx
+++ b/src/views/run-process-panel/run-process-panel.tsx
@@ -6,7 +6,7 @@ import { Dispatch } from 'redux';
 import { connect } from 'react-redux';
 import { RootState } from '~/store/store';
 import { RunProcessPanelRootDataProps, RunProcessPanelRootActionProps, RunProcessPanelRoot } from '~/views/run-process-panel/run-process-panel-root';
-import { goToStep, setWorkflow, runProcess, searchWorkflows, openSetWorkflowDialog } from '~/store/run-process-panel/run-process-panel-actions';
+import { goToStep, runProcess, searchWorkflows, openSetWorkflowDialog } from '~/store/run-process-panel/run-process-panel-actions';
 import { WorkflowResource } from '~/models/workflow';
 
 const mapStateToProps = ({ runProcessPanel }: RootState): RunProcessPanelRootDataProps => {
