X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/88ab5c4388e8bbe9dfa29ef5fff653a511d3096b..1072269cec78f75ec8995afab82d0faaa485f5da:/src/components/data-table-filters/data-table-filters-popover.test.tsx

diff --git a/src/components/data-table-filters/data-table-filters-popover.test.tsx b/src/components/data-table-filters/data-table-filters-popover.test.tsx
index f7bd00f0..d6d52c86 100644
--- a/src/components/data-table-filters/data-table-filters-popover.test.tsx
+++ b/src/components/data-table-filters/data-table-filters-popover.test.tsx
@@ -2,12 +2,12 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from "react";
+import React from "react";
 import { mount, configure } from "enzyme";
 import { DataTableFiltersPopover } from "./data-table-filters-popover";
-import * as Adapter from 'enzyme-adapter-react-16';
+import Adapter from 'enzyme-adapter-react-16';
 import { Checkbox, IconButton } from "@material-ui/core";
-import { getInitialProcessStatusFilters } from "~/store/resource-type-filters/resource-type-filters"
+import { getInitialProcessStatusFilters } from "store/resource-type-filters/resource-type-filters"
 
 configure({ adapter: new Adapter() });
 
