X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/8695e9d621330e691fbcc4bbc1d600d91bae2ac6..cc72c29b709759a4498ad232e3f0374e857c7a62:/src/views/keep-service-panel/keep-service-panel.tsx

diff --git a/src/views/keep-service-panel/keep-service-panel.tsx b/src/views/keep-service-panel/keep-service-panel.tsx
index 2c6323b0..a11cee0b 100644
--- a/src/views/keep-service-panel/keep-service-panel.tsx
+++ b/src/views/keep-service-panel/keep-service-panel.tsx
@@ -21,8 +21,8 @@ const mapStateToProps = (state: RootState): KeepServicePanelRootDataProps => {
 };
 
 const mapDispatchToProps = (dispatch: Dispatch): KeepServicePanelRootActionProps => ({
-    openRowOptions: (event, index, keepService) => {
-        dispatch<any>(openKeepServiceContextMenu(event, index, keepService));
+    openRowOptions: (event, keepService) => {
+        dispatch<any>(openKeepServiceContextMenu(event, keepService));
     }
 });
 
