X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/85836abe716b2403f3b7fe75c551e4ace3995157..39f2ecd2cfa22d7dd6e1dc94f9952bd5c5c13ef2:/src/views/virtual-machine-panel/virtual-machine-user-panel.tsx

diff --git a/src/views/virtual-machine-panel/virtual-machine-user-panel.tsx b/src/views/virtual-machine-panel/virtual-machine-user-panel.tsx
index 091a8198..d0ee5634 100644
--- a/src/views/virtual-machine-panel/virtual-machine-user-panel.tsx
+++ b/src/views/virtual-machine-panel/virtual-machine-user-panel.tsx
@@ -172,7 +172,7 @@ const virtualMachineSendRequest = (props: VirtualMachineProps) =>
     </span>;
 
 const virtualMachinesTable = (props: VirtualMachineProps) =>
-    <Table>
+    <Table data-cy="vm-user-table">
         <TableHead>
             <TableRow>
                 <TableCell>Host name</TableCell>
