X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/84e4588aed7bea1bcf5727ef2eea1a692b4e3bab..33c03ae3c79936cc1a69129f07fba33fe2d28fd8:/src/views/main-panel/main-panel.tsx

diff --git a/src/views/main-panel/main-panel.tsx b/src/views/main-panel/main-panel.tsx
index 7592afb3..edbf5cc4 100644
--- a/src/views/main-panel/main-panel.tsx
+++ b/src/views/main-panel/main-panel.tsx
@@ -4,19 +4,27 @@
 
 import { RootState } from '~/store/store';
 import { connect } from 'react-redux';
+import parse from 'parse-duration';
 import { MainPanelRoot, MainPanelRootDataProps } from '~/views/main-panel/main-panel-root';
 import { isSystemWorking } from '~/store/progress-indicator/progress-indicator-reducer';
 import { isWorkbenchLoading } from '~/store/workbench/workbench-actions';
+import { LinkAccountPanelStatus } from '~/store/link-account-panel/link-account-panel-reducer';
+import { matchLinkAccountRoute } from '~/routes/routes';
 
 const mapStateToProps = (state: RootState): MainPanelRootDataProps => {
     return {
         user: state.auth.user,
         working: isSystemWorking(state.progressIndicator),
         loading: isWorkbenchLoading(state),
-        buildInfo: state.appInfo.buildInfo
+        buildInfo: state.appInfo.buildInfo,
+        uuidPrefix: state.auth.localCluster,
+        isNotLinking: state.linkAccountPanel.status === LinkAccountPanelStatus.NONE || state.linkAccountPanel.status === LinkAccountPanelStatus.INITIAL,
+        isLinkingPath: state.router.location ? matchLinkAccountRoute(state.router.location.pathname) !== null : false,
+        siteBanner: state.auth.config.clusterConfig.Workbench.SiteName,
+        sessionIdleTimeout: parse(state.auth.config.clusterConfig.Workbench.IdleTimeout, 's') || 0
     };
 };
 
 const mapDispatchToProps = null;
 
-export const MainPanel = connect(mapStateToProps, mapDispatchToProps)(MainPanelRoot);
\ No newline at end of file
+export const MainPanel = connect(mapStateToProps, mapDispatchToProps)(MainPanelRoot);
