X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/7edd5a7c86af0814f8a2282aa266a9d1a604a45f..b6ac7fe88d347582d39fffa002e300af222c578f:/src/views-components/sharing-dialog/sharing-public-access-form.tsx

diff --git a/src/views-components/sharing-dialog/sharing-public-access-form.tsx b/src/views-components/sharing-dialog/sharing-public-access-form.tsx
index 1d787d3e..2a216b04 100644
--- a/src/views-components/sharing-dialog/sharing-public-access-form.tsx
+++ b/src/views-components/sharing-dialog/sharing-public-access-form.tsx
@@ -6,8 +6,8 @@ import { reduxForm } from 'redux-form';
 import { compose } from 'redux';
 import { connect } from 'react-redux';
 import SharingPublicAccessFormComponent from './sharing-public-access-form-component';
-import { SHARING_PUBLIC_ACCESS_FORM_NAME } from '~/store/sharing-dialog/sharing-dialog-types';
-import { RootState } from '~/store/store';
+import { SHARING_PUBLIC_ACCESS_FORM_NAME } from 'store/sharing-dialog/sharing-dialog-types';
+import { RootState } from 'store/store';
 import { getSharingPublicAccessFormData } from '../../store/sharing-dialog/sharing-dialog-types';
 
 export const SharingPublicAccessForm = compose(
