X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/7d1fded42f510a082f4274531de2b7f591919bdb..2f857ebcd67a607b7fde9c0ea4808ac30c591876:/src/views/process-panel/process-subprocesses-card.tsx

diff --git a/src/views/process-panel/process-subprocesses-card.tsx b/src/views/process-panel/process-subprocesses-card.tsx
index 7b455b67..9607f49a 100644
--- a/src/views/process-panel/process-subprocesses-card.tsx
+++ b/src/views/process-panel/process-subprocesses-card.tsx
@@ -42,7 +42,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         color: theme.palette.common.white,
     },
     status: {
-        paddingTop: theme.spacing.unit * 0.5,
+        paddingTop: theme.spacing.unit * 0.75,
         color: theme.palette.common.white,
     },
     rightSideHeader: {
