X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/7a2f0082071947bfec27ed4f2a16250e1d611d21..33c03ae3c79936cc1a69129f07fba33fe2d28fd8:/src/views/run-process-panel/run-process-inputs-form.tsx?ds=sidebyside

diff --git a/src/views/run-process-panel/run-process-inputs-form.tsx b/src/views/run-process-panel/run-process-inputs-form.tsx
index 9b3379a3..45b97117 100644
--- a/src/views/run-process-panel/run-process-inputs-form.tsx
+++ b/src/views/run-process-panel/run-process-inputs-form.tsx
@@ -7,7 +7,7 @@ import { reduxForm, InjectedFormProps } from 'redux-form';
 import { CommandInputParameter, CWLType, IntCommandInputParameter, BooleanCommandInputParameter, FileCommandInputParameter, DirectoryCommandInputParameter, DirectoryArrayCommandInputParameter, FloatArrayCommandInputParameter, IntArrayCommandInputParameter } from '~/models/workflow';
 import { IntInput } from '~/views/run-process-panel/inputs/int-input';
 import { StringInput } from '~/views/run-process-panel/inputs/string-input';
-import { StringCommandInputParameter, FloatCommandInputParameter, isPrimitiveOfType, File, Directory, WorkflowInputsData, EnumCommandInputParameter, isArrayOfType, StringArrayCommandInputParameter, FileArrayCommandInputParameter } from '../../models/workflow';
+import { StringCommandInputParameter, FloatCommandInputParameter, isPrimitiveOfType, WorkflowInputsData, EnumCommandInputParameter, isArrayOfType, StringArrayCommandInputParameter, FileArrayCommandInputParameter } from '../../models/workflow';
 import { FloatInput } from '~/views/run-process-panel/inputs/float-input';
 import { BooleanInput } from './inputs/boolean-input';
 import { FileInput } from './inputs/file-input';
