X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/793c341959d618ffb76bf8f1030f94e33870919c..825ea4fce4ba3568f6105c17e83f4769a9323759:/src/views/run-process-panel/inputs/string-array-input.tsx

diff --git a/src/views/run-process-panel/inputs/string-array-input.tsx b/src/views/run-process-panel/inputs/string-array-input.tsx
index c73b39bf..39dbe0af 100644
--- a/src/views/run-process-panel/inputs/string-array-input.tsx
+++ b/src/views/run-process-panel/inputs/string-array-input.tsx
@@ -47,7 +47,7 @@ class InputComponent extends React.PureComponent<GenericInputProps>{
             deletable={!commandInput.disabled}
             orderable={!commandInput.disabled}
             disabled={commandInput.disabled}
-            value={input.value}
+            values={input.value}
             onChange={this.handleChange}
             createNewValue={identity}
             inputComponent={Input}
