X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/78fd0936352c6f50f06bd0c6f9973bccc1ac0d51..a6d1469a04f5a6a658cdeac5fc8a11f01d3a1c02:/src/components/default-code-snippet/default-code-snippet.tsx

diff --git a/src/components/default-code-snippet/default-code-snippet.tsx b/src/components/default-code-snippet/default-code-snippet.tsx
index e8b89f32..c81865db 100644
--- a/src/components/default-code-snippet/default-code-snippet.tsx
+++ b/src/components/default-code-snippet/default-code-snippet.tsx
@@ -19,7 +19,8 @@ const theme = createMuiTheme({
         }
     },
     typography: {
-        fontFamily: 'monospace'
+        fontFamily: 'monospace',
+        useNextVariants: true,
     }
 });
 
