X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/78fd0936352c6f50f06bd0c6f9973bccc1ac0d51..8df09b8ee52974e5bcd5fea862c3639f54afb54b:/src/views/process-log-panel/process-log-code-snippet.tsx

diff --git a/src/views/process-log-panel/process-log-code-snippet.tsx b/src/views/process-log-panel/process-log-code-snippet.tsx
index d02fc02c..a7f6c476 100644
--- a/src/views/process-log-panel/process-log-code-snippet.tsx
+++ b/src/views/process-log-panel/process-log-code-snippet.tsx
@@ -27,7 +27,8 @@ const theme = createMuiTheme({
         }
     },
     typography: {
-        fontFamily: 'monospace'
+        fontFamily: 'monospace',
+        useNextVariants: true,
     }
 });
 
