X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/785a62a8934dc439cbd201d9011775ccbcbb2c24..7467e941ed63e8885144e90c9ca11929f738b13a:/src/views/run-process-panel/inputs/enum-input.tsx

diff --git a/src/views/run-process-panel/inputs/enum-input.tsx b/src/views/run-process-panel/inputs/enum-input.tsx
index 3b0289e7..f554aff2 100644
--- a/src/views/run-process-panel/inputs/enum-input.tsx
+++ b/src/views/run-process-panel/inputs/enum-input.tsx
@@ -2,10 +2,10 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { Field } from 'redux-form';
 import { Select, MenuItem } from '@material-ui/core';
-import { EnumCommandInputParameter, CommandInputEnumSchema } from '~/models/workflow';
+import { EnumCommandInputParameter, CommandInputEnumSchema } from 'models/workflow';
 import { GenericInputProps, GenericInput } from './generic-input';
 
 export interface EnumInputProps {
