X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/7597dab11b25e5bb67becf99db622f7f7737a235..825ea4fce4ba3568f6105c17e83f4769a9323759:/src/views/run-process-panel/inputs/generic-input.tsx

diff --git a/src/views/run-process-panel/inputs/generic-input.tsx b/src/views/run-process-panel/inputs/generic-input.tsx
index 4ed2654e..066bf2b8 100644
--- a/src/views/run-process-panel/inputs/generic-input.tsx
+++ b/src/views/run-process-panel/inputs/generic-input.tsx
@@ -4,8 +4,8 @@
 
 import * as React from 'react';
 import { WrappedFieldProps } from 'redux-form';
-import { FormGroup, FormLabel, Input, FormHelperText, FormControl } from '@material-ui/core';
-import { GenericCommandInputParameter, getInputLabel, isRequiredInput } from '../../../models/workflow';
+import { FormGroup, FormLabel, FormHelperText } from '@material-ui/core';
+import { GenericCommandInputParameter, getInputLabel, isRequiredInput } from '~/models/workflow';
 
 export type GenericInputProps = WrappedFieldProps & {
     commandInput: GenericCommandInputParameter<any, any>;
@@ -22,9 +22,7 @@ export const GenericInput = ({ component: Component, ...props }: GenericInputCon
             error={props.meta.touched && !!props.meta.error}>
             {getInputLabel(props.commandInput)}
         </FormLabel>
-        <FormControl>
-            <Component {...props} />
-        </FormControl>
+        <Component {...props} />
         <FormHelperText error={props.meta.touched && !!props.meta.error}>
             {
                 props.meta.touched && props.meta.error
