X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/750ece46ef69eec338523c63c834cd87901c1342..7ae86efd9905582df4191910528c3803a68ba81b:/src/views/project-panel/project-panel.tsx

diff --git a/src/views/project-panel/project-panel.tsx b/src/views/project-panel/project-panel.tsx
index 17b0fd72..81d84990 100644
--- a/src/views/project-panel/project-panel.tsx
+++ b/src/views/project-panel/project-panel.tsx
@@ -38,7 +38,7 @@ const renderName = (item: ProjectPanelItem) =>
             {renderIcon(item)}
         </Grid>
         <Grid item>
-            <Typography color="primary">
+            <Typography color="default">
                 {item.name}
             </Typography>
         </Grid>
