X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/71b9264c1720e619f8cfcb297a7848ece420c61c..d5f11bb2fbb20c85e8ef857caedd58adf333e522:/src/components/data-explorer/data-explorer.test.tsx?ds=sidebyside

diff --git a/src/components/data-explorer/data-explorer.test.tsx b/src/components/data-explorer/data-explorer.test.tsx
index 1d8738ab..dc7e8725 100644
--- a/src/components/data-explorer/data-explorer.test.tsx
+++ b/src/components/data-explorer/data-explorer.test.tsx
@@ -2,9 +2,9 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from "react";
+import React from "react";
 import { configure, mount } from "enzyme";
-import * as Adapter from 'enzyme-adapter-react-16';
+import Adapter from 'enzyme-adapter-react-16';
 
 import { DataExplorer } from "./data-explorer";
 import { ColumnSelector } from "../column-selector/column-selector";
