X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/71b9264c1720e619f8cfcb297a7848ece420c61c..1830df4301d5e1dda4ac4ffde1eb65df6039d180:/src/views/process-log-panel/process-log-code-snippet.tsx

diff --git a/src/views/process-log-panel/process-log-code-snippet.tsx b/src/views/process-log-panel/process-log-code-snippet.tsx
index a7f6c476..c8b1766f 100644
--- a/src/views/process-log-panel/process-log-code-snippet.tsx
+++ b/src/views/process-log-panel/process-log-code-snippet.tsx
@@ -18,7 +18,7 @@ const styles: StyleRulesCallback<CssRules> = () => ({
 const theme = createMuiTheme({
     overrides: {
         MuiTypography: {
-            body1: {
+            body2: {
                 color: grey["200"]
             },
             root: {
