X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/6fdd4a4d609cf8fa459786f42eb337f8da6a5afa..3d1c23fe4f88c28a66ea1f4c5a730c37ecbe58bd:/src/index.tsx

diff --git a/src/index.tsx b/src/index.tsx
index aa372fa5..d428b1c3 100644
--- a/src/index.tsx
+++ b/src/index.tsx
@@ -8,7 +8,7 @@ import { Provider } from "react-redux";
 import { MainPanel } from '~/views/main-panel/main-panel';
 import '~/index.css';
 import { Route, Switch } from 'react-router';
-import createBrowserHistory from "history/createBrowserHistory";
+import { createBrowserHistory } from "history";
 import { History } from "history";
 import { configureStore, RootStore } from '~/store/store';
 import { ConnectedRouter } from "react-router-redux";
@@ -166,5 +166,3 @@ const initListener = (history: History, store: RootStore, services: ServiceRepos
         }
     };
 };
-
-// force build comment #1
