X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/6b9cb4f828257684edba0809461fa2f508d20f15..e7a3f670ea3fa984fb704b204772ba98a5cf4451:/src/components/data-table/data-table.tsx

diff --git a/src/components/data-table/data-table.tsx b/src/components/data-table/data-table.tsx
index 155d772f..24cd9140 100644
--- a/src/components/data-table/data-table.tsx
+++ b/src/components/data-table/data-table.tsx
@@ -157,6 +157,10 @@ export const DataTable = withStyles(styles)(
             }
         }
 
+        componentWillUnmount(): void {
+            this.initializeCheckedList([])
+        }
+
         checkBoxColumn: DataColumn<any, any> = {
             name: "checkBoxColumn",
             selected: true,
