X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/699f7cebc3057ddf22ca3c43c3d3534d605972ec..37ebbbd4f05f811582546823738619f1fbb97686:/src/views/workbench/workbench.tsx

diff --git a/src/views/workbench/workbench.tsx b/src/views/workbench/workbench.tsx
index c7bfc8b4..eaf3a2ee 100644
--- a/src/views/workbench/workbench.tsx
+++ b/src/views/workbench/workbench.tsx
@@ -147,7 +147,7 @@ class Workbench extends React.Component<WorkbenchProps, WorkbenchState> {
                             <Route path="/projects/:id" render={this.renderProjectPanel} />
                         </Switch>
                     </div>
-                    <DetailsPanel />
+                    { user && <DetailsPanel /> }
                 </main>
                 <ContextMenu />
                 <CreateProjectDialog />
