X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/68c2068a9371fd5b158adbeef0ba0021832c8a76..16b3b3bd729ff4fa9fa8d197a3388ece39785a23:/src/views/repositories-panel/repositories-panel.tsx

diff --git a/src/views/repositories-panel/repositories-panel.tsx b/src/views/repositories-panel/repositories-panel.tsx
index c7016f62..62e91b5f 100644
--- a/src/views/repositories-panel/repositories-panel.tsx
+++ b/src/views/repositories-panel/repositories-panel.tsx
@@ -103,7 +103,7 @@ export const RepositoriesPanel = compose(
                                 <Grid item xs={8}>
                                     <Typography variant="body2">
                                         When you are using an Arvados virtual machine, you should clone the https:// URLs. This will authenticate automatically using your API token. <br />
-                                        In order to clone git repositories using SSH, <Link to={Routes.SSH_KEYS} className={classes.link}>add an SSH key to your account</Link> and clone the git@ URLs.
+                                        In order to clone git repositories using SSH, <Link to={Routes.SSH_KEYS_USER} className={classes.link}>add an SSH key to your account</Link> and clone the git@ URLs.
                                     </Typography>
                                 </Grid>
                                 <Grid item xs={4} className={classes.button}>
