X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/6653b7a7edbac351f5b3734114d6b5904dda1acc..27542ce48fa48c5bbe16e96a3ffd1cea0be0cc47:/src/components/workflow-inputs-form/workflow-input.tsx?ds=sidebyside

diff --git a/src/components/workflow-inputs-form/workflow-input.tsx b/src/components/workflow-inputs-form/workflow-input.tsx
index 3a15d158..d555d3cc 100644
--- a/src/components/workflow-inputs-form/workflow-input.tsx
+++ b/src/components/workflow-inputs-form/workflow-input.tsx
@@ -2,10 +2,10 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
-import { CommandInputParameter } from '~/models/workflow';
+import React from 'react';
+import { CommandInputParameter } from 'models/workflow';
 import { TextField } from '@material-ui/core';
-import { required } from '~/components/workflow-inputs-form/validators';
+import { required } from 'components/workflow-inputs-form/validators';
 
 export interface WorkflowInputProps {
     input: CommandInputParameter;
