X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/6489c3c665762cb84eb752d53a91cd2356d1f791..bf7a90e5d5d606456e0ec51cc2709d2f1da76d7d:/src/components/switch-field/switch-field.tsx

diff --git a/src/components/switch-field/switch-field.tsx b/src/components/switch-field/switch-field.tsx
index ac7b140e..0c63a36c 100644
--- a/src/components/switch-field/switch-field.tsx
+++ b/src/components/switch-field/switch-field.tsx
@@ -2,8 +2,8 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
-import { FormFieldProps, FormField } from '~/components/form-field/form-field';
+import React from 'react';
+import { FormFieldProps, FormField } from 'components/form-field/form-field';
 import { Switch } from '@material-ui/core';
 import { SwitchProps } from '@material-ui/core/Switch';
 
