X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/6149700b801fc2cdb83b0e700bbb319850ed471d..ceca6c57cc7d0357ab74abd47b80633a885ec575:/src/components/details-attribute/details-attribute.tsx

diff --git a/src/components/details-attribute/details-attribute.tsx b/src/components/details-attribute/details-attribute.tsx
index fd8e948f..78b4341d 100644
--- a/src/components/details-attribute/details-attribute.tsx
+++ b/src/components/details-attribute/details-attribute.tsx
@@ -17,10 +17,12 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         marginBottom: theme.spacing.unit
     },
     label: {
+        boxSizing: 'border-box',
         color: theme.palette.grey["500"],
         width: '40%'
     },
     value: {
+        boxSizing: 'border-box',
         width: '60%',
         display: 'flex',
         alignItems: 'flex-start',
