X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/5e8a5a1c42226e0dd3aceaf4825d870a3786c5d1..6a1b2741a1ac383be09971a957553d2d15de6d5b:/src/views/favorite-panel/favorite-panel.tsx?ds=sidebyside

diff --git a/src/views/favorite-panel/favorite-panel.tsx b/src/views/favorite-panel/favorite-panel.tsx
index 4ba967c0..948885f7 100644
--- a/src/views/favorite-panel/favorite-panel.tsx
+++ b/src/views/favorite-panel/favorite-panel.tsx
@@ -30,7 +30,6 @@ import { navigateTo } from '~/store/navigation/navigation-action';
 import { ContainerRequestState } from "~/models/container-request";
 import { FavoritesState } from '../../store/favorites/favorites-reducer';
 import { RootState } from '~/store/store';
-import { PanelDefaultView } from '~/components/panel-default-view/panel-default-view';
 import { DataTableDefaultView } from '~/components/data-table-default-view/data-table-default-view';
 
 type CssRules = "toolbar" | "button";
