X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/5e88476747d9fb0c77ef76d63430192fa4b77f22..c90e813adcec89899d9db95843295a84fb058c3e:/src/index.tsx

diff --git a/src/index.tsx b/src/index.tsx
index cf1610f8..ba395e8b 100644
--- a/src/index.tsx
+++ b/src/index.tsx
@@ -26,7 +26,8 @@ const store = configureStore({
     },
     auth: {
         user: undefined
-    }
+    },
+    sidePanel: []
 }, history);
 
 store.dispatch(authActions.INIT());
