X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/5e12403f4dcfe39eda79c256a94ceadc90458a99..5005f810d8c5e8c9e8c94c5981b014e41d2a40b3:/src/views/collection-panel/collection-panel.tsx

diff --git a/src/views/collection-panel/collection-panel.tsx b/src/views/collection-panel/collection-panel.tsx
index a28d5254..df1b1f1d 100644
--- a/src/views/collection-panel/collection-panel.tsx
+++ b/src/views/collection-panel/collection-panel.tsx
@@ -73,14 +73,14 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     },
     iconHeader: {
         fontSize: '1.875rem',
-        color: theme.customs.colors.yellow700
+        color: theme.customs.colors.greyL
     },
     tag: {
         marginRight: theme.spacing.unit / 2,
         marginBottom: theme.spacing.unit / 2
     },
     label: {
-        fontSize: '0.875rem'
+        fontSize: '0.875rem',
     },
     centeredLabel: {
         fontSize: '0.875rem',
