X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/5941908e7a1d369ca823702f60e8fd048ae08a9a..3d1c23fe4f88c28a66ea1f4c5a730c37ecbe58bd:/src/index.tsx

diff --git a/src/index.tsx b/src/index.tsx
index bf810fb7..d428b1c3 100644
--- a/src/index.tsx
+++ b/src/index.tsx
@@ -166,5 +166,3 @@ const initListener = (history: History, store: RootStore, services: ServiceRepos
         }
     };
 };
-
-// force build comment #1
