X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/59171e2cf2ce2740825be7b19d580a2bfa0081f5..1671375fc47aa0be6f3e8ea41a4756729d0f00b4:/src/components/collection-panel-files/collection-panel-files.tsx

diff --git a/src/components/collection-panel-files/collection-panel-files.tsx b/src/components/collection-panel-files/collection-panel-files.tsx
index 4b631a6a..06c3504a 100644
--- a/src/components/collection-panel-files/collection-panel-files.tsx
+++ b/src/components/collection-panel-files/collection-panel-files.tsx
@@ -328,12 +328,7 @@ export const CollectionPanelFiles = withStyles(styles)(connect((state: RootState
     const currentPDH = (collectionPanel.item || {}).portableDataHash;
     React.useEffect(() => {
         if (currentPDH) {
-            // Avoid fetching the same content level twice
-            if (leftKey !== rightKey) {
-                fetchData([leftKey, rightKey], true);
-            } else {
-                fetchData(rightKey, true);
-            }
+            fetchData([leftKey, rightKey], true);
         }
     }, [currentPDH]); // eslint-disable-line react-hooks/exhaustive-deps
 
