X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/59100a72caedbc8f3c9872de1153bf3d4129122a..8753f89e9f786a12cf72374ffb1c9146b598d285:/src/views/run-process-panel/run-process-inputs-form.tsx

diff --git a/src/views/run-process-panel/run-process-inputs-form.tsx b/src/views/run-process-panel/run-process-inputs-form.tsx
index 37349a6e..9b3379a3 100644
--- a/src/views/run-process-panel/run-process-inputs-form.tsx
+++ b/src/views/run-process-panel/run-process-inputs-form.tsx
@@ -35,7 +35,7 @@ const inputsSelector = (props: RunProcessInputFormProps) =>
 const initialValuesSelector = createSelector(
     inputsSelector,
     inputs => inputs.reduce(
-        (values, input) => ({ ...values, [input.id]: input.default }),
+        (values, input) => ({ ...values, [input.id]: input.value || input.default }),
         {}));
 
 const propsSelector = createStructuredSelector({
