X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/59100a72caedbc8f3c9872de1153bf3d4129122a..368c579bfe87bedf8905b5200fb4829ea0f1f905:/src/components/int-input/int-input.tsx

diff --git a/src/components/int-input/int-input.tsx b/src/components/int-input/int-input.tsx
index 0527efa3..26277b49 100644
--- a/src/components/int-input/int-input.tsx
+++ b/src/components/int-input/int-input.tsx
@@ -2,7 +2,7 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { Input } from '@material-ui/core';
 import { InputProps } from '@material-ui/core/Input';
 
