X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/576cd73ae073187557df3239ca301c16eaca7ae9..b5b75b89e923864389f814af97974a55b69a343f:/src/components/collection-panel-files/collection-panel-files.tsx?ds=sidebyside

diff --git a/src/components/collection-panel-files/collection-panel-files.tsx b/src/components/collection-panel-files/collection-panel-files.tsx
index cf0b5e46..2ba29d44 100644
--- a/src/components/collection-panel-files/collection-panel-files.tsx
+++ b/src/components/collection-panel-files/collection-panel-files.tsx
@@ -85,7 +85,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: Theme) => ({
     wrapper: {
         display: 'flex',
         minHeight: '600px',
-        color: 'rgba(0, 0, 0, 0.87)',
+        color: 'rgba(0,0,0,0.87)',
         fontSize: '0.875rem',
         fontFamily: '"Roboto", "Helvetica", "Arial", sans-serif',
         fontWeight: 400,
