X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/56e6dc7af513fd7bdb043e9c74a1d2848da41c38..63a5dc75ae9b68b3570e3bee1662155572cf5d1f:/src/views/not-found-panel/not-found-panel-root.tsx

diff --git a/src/views/not-found-panel/not-found-panel-root.tsx b/src/views/not-found-panel/not-found-panel-root.tsx
index 06a74a68..e5d8507b 100644
--- a/src/views/not-found-panel/not-found-panel-root.tsx
+++ b/src/views/not-found-panel/not-found-panel-root.tsx
@@ -23,7 +23,7 @@ const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
         fontSize: '18px'
     },
     active: {
-        color: theme.customs.colors.green700,
+        color: theme.customs.colors.grey700,
         textDecoration: 'none',
     }
 });
