X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/56156171fe65695dcec41f540735fd559655a11b..da1b362fc33261ace42851f6900df7b96fde819e:/src/views-components/auto-logout/auto-logout.test.tsx

diff --git a/src/views-components/auto-logout/auto-logout.test.tsx b/src/views-components/auto-logout/auto-logout.test.tsx
index 49496724..c9b9e2b8 100644
--- a/src/views-components/auto-logout/auto-logout.test.tsx
+++ b/src/views-components/auto-logout/auto-logout.test.tsx
@@ -2,9 +2,9 @@
 //
 // SPDX-License-Identifier: AGPL-3.0
 
-import * as React from 'react';
+import React from 'react';
 import { configure, mount } from "enzyme";
-import * as Adapter from 'enzyme-adapter-react-16';
+import Adapter from 'enzyme-adapter-react-16';
 import { AutoLogoutComponent, AutoLogoutProps, LAST_ACTIVE_TIMESTAMP } from './auto-logout';
 
 configure({ adapter: new Adapter() });
