X-Git-Url: https://git.arvados.org/arvados-workbench2.git/blobdiff_plain/52b507cead2443e6566fb8679df71ef9cf8dbe5c..cdad04a31b572aa401e3f5d1fdc2c0f69d6e2d08:/src/views-components/search-bar/search-bar-advanced-view.tsx

diff --git a/src/views-components/search-bar/search-bar-advanced-view.tsx b/src/views-components/search-bar/search-bar-advanced-view.tsx
index 05bdb970..b001cb3e 100644
--- a/src/views-components/search-bar/search-bar-advanced-view.tsx
+++ b/src/views-components/search-bar/search-bar-advanced-view.tsx
@@ -27,7 +27,8 @@ type CssRules = 'container' | 'closeIcon' | 'label' | 'buttonWrapper'
 const styles: StyleRulesCallback<CssRules> = (theme: ArvadosTheme) => ({
     container: {
         padding: theme.spacing.unit * 2,
-        borderBottom: `1px solid ${theme.palette.grey["200"]}`
+        borderBottom: `1px solid ${theme.palette.grey["200"]}`,
+        position: 'relative',
     },
     closeIcon: {
         position: 'absolute',
